Title: Double-Acting Cylinder (Pneumatics) - Troubleshooting
Course: Troubleshooting Labs > Section: Sample Troubleshooting Component Pages

Pneumatic Double-Acting Cylinder - verify fittings, pressure, not damaged

Common Component Failure Problems

- Cylinder is not moving.
  - Verify component has flow and correct pressure.
  - If no flow, verify hoses are hooked up correctly and not leaking.
    - Fix hoses.
  - If incorrect pressure, check upstream in the system.
    - Fix pressure or issue upstream.
- Cylinder doesn't move smoothly or stutters.
  - Possible internal damage, such as seals worn out.
    - Replace component.
- Rod does not come out correctly or all the way.
  - Possibly internal damage such as a bent rod or the inside of the cylinder is pitted.
    - Replace component.

Troubleshooting Instrumentation/Tools

- Gauges
- Observations
- Flow Meter

Troubleshooting Step-by-Step Example

Additional Troubleshooting Information

Related Parts:

- Single-Acting Cylinder
- Double-Acting Cylinder with Cushion

Schematic:

Where to Buy:

Large - Automation Studio

Small - Automation Studio

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.