Title: Course Overview + More Information
Course: Troubleshooting Labs > Section: Orientation

This course was uploaded in 2025 and is a sample of the troubleshooting work done. BTECH continues to develop more troubleshooting resources. For more complete or updated curriculum, reach out to Bridgerland Technical College or visit the microsite for the project here: Teaching Technicians Troubleshooting with Mini Industry 4.0 Factories microsite.