Title: Preventative Maintenance Overview
Course: Manufacturing Analytics (ATE Central) > Section: Module 3 - Preventative Maintenance

Introduction

In the manufacturing industry, implementing preventative maintenance is critical to minimizing downtime, extending equipment life, and reducing unexpected repair costs. By proactively identifying and addressing potential machine issues or scheduled outages, companies can avoid costly disruptions, optimize productivity, and improve overall operational efficiency.

Objectives

In this module, you will:

- Explain the purpose of preventative maintenance and its impact on equipment performance and reliability.
- Identify and interpret key maintenance metrics to evaluate equipment health and maintenance effectiveness.

How to Succeed

To be successful in this module, make sure you:

- Read all content pages and pay attention to the terms mentioned.
- Watch the Pandas - Iterrows video. This will help you complete the Data Loobs Lab.
- Reach out to your instructor for help if you have questions.

Additional Resources (Optional)

- What is Preventive Maintenance? | IBM