Title: Data Loops Lab (Pandas - Iterrows)
Course: Manufacturing Analytics (ATE Central) > Section: Module 3 - Preventative Maintenance

Q: Using your plan from the previous section, write a conditional to break your for loop when one of the motors is at risk of failing.

Paste your for loop into the space below and answer the following questions.

Q: Which motor did your code flag?
- Motor 1
- Motor 2
- Motor 3
- Motor 4
A: Motor 2